<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">%	\iffalse meta-comment
%
%	Copyright (C) 2020 by Brian W. Mulligan &lt;bwmulligan@astronaos.com&gt;
% -----------------------------------------------------------
%
% This file may be distributed and/or modified under the conditions of
% the LaTeX Project Public License, either version 1.3c of this license
% or (at your option) any later version. The latest version of this
% license is in:
%
% http://www.latex-project.org/lppl.txt
%
% and version 1.3c or later is part of all distributions of LaTeX
% version 2006/05/20 or later.
%
% \fi
%
% \iffalse
%&lt;*driver&gt;
\ProvidesFile{physunits.dtx}
%&lt;/driver&gt;
%&lt;package&gt;\NeedsTeXFormat{LaTeX2e}[1994/06/01]
%&lt;package&gt; \ProvidesPackage{physunits}
%&lt;*package&gt;
    [2020/03/26 v1.2.0 Physical units package]
%&lt;/package&gt;
%&lt;package&gt;\ProcessOptions\relax
%&lt;*driver&gt;
\documentclass{ltxdoc}
\usepackage{physunits}
\usepackage[backref]{hyperref}
\EnableCrossrefs
\CodelineIndex
\RecordChanges
%\OnlyDescription
\begin{document}
\DocInput{physunits.dtx}
\PrintChanges
\PrintIndex
\end{document}
%&lt;/driver&gt;
% \fi
%
% \CheckSum{496}
%
% \CharacterTable
%  {Upper-case    \A\B\C\D\E\F\G\H\I\J\K\L\M\N\O\P\Q\R\S\T\U\V\W\X\Y\Z
%   Lower-case    \a\b\c\d\e\f\g\h\i\j\k\l\m\n\o\p\q\r\s\t\u\v\w\x\y\z
%   Digits        \0\1\2\3\4\5\6\7\8\9
%   Exclamation   \!     Double quote  \"     Hash (number) \#
%   Dollar        \$     Percent       \%     Ampersand     \&amp;
%   Acute accent  \'     Left paren    \(     Right paren   \)
%   Asterisk      \*     Plus          \+     Comma         \,
%   Minus         \-     Point         \.     Solidus       \/
%   Colon         \:     Semicolon     \;     Less than     \&lt;
%   Equals        \=     Greater than  \&gt;     Question mark \?
%   Commercial at \@     Left bracket  \[     Backslash     \\
%   Right bracket \]     Circumflex    \^     Underscore    \_
%   Grave accent  \`     Left brace    \{     Vertical bar  \|
%   Right brace   \}     Tilde         \~}
%
% \changes{v1.0}{2020/01/23}{Initial version}
% \changes{v1.0.1}{2020/01/25}{Clean up formatting, fix index}
% \changes{v1.0.2}{2020/01/25}{External changes in makefile}
% \changes{v1.0.3}{2020/01/26}{External changes in makefile}
% \changes{v1.0.4}{2020/03/26}{Corrected version number and date in 
% documentation}
% \changes{v1.1.0}{2020/11/02}{Corrected spelling of Celsius}
% \changes{v1.2.0}{2020/03/26}{Added centigrade}
%
% \GetFileInfo{physunits.dtx}
% \DeclareRobustCommand{\fileversion}{v1.2.0}
% \DeclareRobustCommand{\filedate}{2021/03/26}
%
% \DoNotIndex{\DeclareRobustCommand,\newenvironment,\DeclareRobustCommand,
%  \left,\right,\textbf,\mathrm,\ensuremath,\units@separator,\expandafter,\,}
%
% \title{The \textsf{physunits} package\thanks{This document corresponds to%
%  \textsf{physunits}~\fileversion, dated \filedate.}}
% \author{Brian W. Mulligan \\ \texttt{bwmulligan@astronaos.com}}
%
% \maketitle
% \setlength{\parindent}{0em}
% \setlength{\parskip}{1em}
%
% \section{Introduction}
%
%
% This package consists of several macros that are shorthand for a variety of
% physical units that are commonly used in introductory level physics and 
% astronomy classes. 
%
% At present, this package provides some similar units to those in siunitx, but
% is uses slightly different macro names for each. This package also provides
% a number of non-SI units (e.g. erg, cm, BTU).
% 
%
% \section{Prerequisites / Dependencies}
% \changes{v1.0.4}{2020/03/26}{Added section for dependencies.}
%
% \subsection{General}
% This package requires the \verb|physunits| package.%
%
% \subsection{Generating Documentation}
% The \verb|hyperref| package are required to generate the documentation
% (this file) for this package.
%
% \section{Acknowledgements}
% \changes{v1.0.4}{2020/03/26}{Added section for acknowledgements.}
%
% The author would like to thank Brian Dunn for catching bugs in the temperature
% units and kcal, leading to changes in v1.0.4.
%
% \section{Bug Reporting}
% \changes{v1.0.4}{2020/03/26}{Added section for bug reporting.}
%
% Please report bugs or issues in this package using github, at
% \url{https://github.com/astrobit/physunits/issues}.%
%
% \section{Naming Convention}
%
% most macros consist of just the commonly used letter or unit, e.g. 
% \textbackslash m for 
% meters. In cases where the simple form of the unit conflicts with an existing
% \LaTeX~macro, then the full word is used, starting with a upper-case letter,
% e.g. \textbackslash Coulomb.
%
% One notable exception to the above naming convention is the use of 
% \textbackslash gm for
% grams, instead of \textbackslash g or \textbackslash Gram.
%
% \section{Base and Prefixes}
%
% Most units are in the base unit only, but some very commonly used prefixes
% are available as part of the macro, e.g. \textbackslash kg for kilogram, 
% \textbackslash cm for centimeter.
% For base units, each macro accepts one option that can be used to specify
% the prefix, for example \textbackslash m[n] will result in nm. The macros 
% enforce math
% mode, so \textbackslash m[\textbackslash micro] will result in 
% $\mathrm{\mu m}$.
%
%
% \section{Macro Usage}
%
%
% \subsection{Special Macros}
%
%
% \DescribeMacro{\units@separator}
% |\units@separator| is a special macro used to set the spacing between a
% quantity and the associated units.
%
% \DescribeMacro{\micro}
% |\micro| is a special macro that can be used for the prefix $\mathrm{\mu}$
% (micro-). Internally it just uses \textbackslash mu. 
%
% \subsection{Electricity \&amp; Magnetism}
% \index{Electricity \&amp; Magnetism|usage(}
%
% \DescribeMacro{\V}
% \index{Electricity \&amp; Magnetism&gt;Volts|usage}
% |\V| is a macro for Volts (V).
% This macro accepts an optional argument for a prefix. If no option is 
% supplied, no prefix will be prepended.
%
% \DescribeMacro{\Volt}
% \index{Electricity \&amp; Magnetism&gt;Volts|usage}
% |\Volt| is a macro for Volts (V).
% This macro accepts an optional argument for a prefix. If no option is 
% supplied, no prefix will be prepended.
%
% \DescribeMacro{\Coulomb}
% \index{Electricity \&amp; Magnetism&gt;Coulomb|usage}
% |\Coulomb| is a macro for Coulombs (C).
% This macro accepts an optional argument for a prefix. If no option is 
% supplied, no prefix will be prepended.
%
% \DescribeMacro{\esu}
% \index{Electricity \&amp; Magnetism&gt;esu|usage}
% |\esu| is a macro for electrostatic units (esu), the units of charge in
% Gaussian cgs.
%
% \DescribeMacro{\Ohm}
% \index{Electricity \&amp; Magnetism&gt;Ohm|usage}
% |\Ohm| is a macro for Ohms ($\Omega$).
% This macro accepts an optional argument for a prefix. If no option is 
% supplied, no prefix will be prepended.
%
% \DescribeMacro{\Amp}
% \index{Electricity \&amp; Magnetism&gt;Amperes|usage}
% |\Amp| is a macro for Amperes (A).
% This macro accepts an optional argument for a prefix. If no option is 
% supplied, no prefix will be prepended.
%
% \DescribeMacro{\Farad}
% \index{Electricity \&amp; Magnetism&gt;Farad|usage}
% |\Farad| is a macro for Farads (F).
% This macro accepts an optional argument for a prefix. If no option is 
% supplied, no prefix will be prepended.
%
% \DescribeMacro{\Tesla}
% \index{Electricity \&amp; Magnetism&gt;Tesla|usage}
% |\Tesla| is a macro for Teslas (T).
% This macro accepts an optional argument for a prefix. If no option is 
% supplied, no prefix will be prepended.
%
% \DescribeMacro{\Gauss}
% \index{Electricity \&amp; Magnetism&gt;Gauss|usage}
% |\Gauss| is a macro for Gauss (G), the units for magnetic field strength in
% Gaussian cgs.
% This macro accepts an optional argument for a prefix. If no option is 
% supplied, no prefix will be prepended.
%
% \DescribeMacro{\Henry}
% \index{Electricity \&amp; Magnetism&gt;Henry|usage}
% |\Henry| is a macro for Henrys (H).
% This macro accepts an optional argument for a prefix. If no option is 
% supplied, no prefix will be prepended.
% \index{Electricity \&amp; Magnetism|usage)}
%
% \subsection{Energy}
% \index{Energy|usage(}
%
% \DescribeMacro{\eV}
% \index{Energy&gt;eV|usage}
% |\eV| is a macro for electron Volts (eV).
% This macro accepts an optional argument for a prefix. If no option is 
% supplied, no prefix will be prepended.
%
% \DescribeMacro{\keV}
% \index{Energy&gt;eV|usage}
% |\keV| is a macro for kilo-electron Volts (keV).
%
% \DescribeMacro{\MeV}
% \index{Energy&gt;eV|usage}
% |\MeV| is a macro for mega-electron Volts (MeV).
%
% \DescribeMacro{\J}
% \index{Energy&gt;Joules|usage}
% |\J| is a macro for Joules (J).
% This macro accepts an optional argument for a prefix. If no option is 
% supplied, no prefix will be prepended.
%
% \DescribeMacro{\Joule}
% \index{Energy&gt;Joules|usage}
% |\Joule| is a macro for Joules (J).
% This macro accepts an optional argument for a prefix. If no option is 
% supplied, no prefix will be prepended.
%
% \DescribeMacro{\erg}
% \index{Energy&gt;erg|usage}
% |\erg| is a macro for ergs (erg), the unit of energy in cgs.
%
% \DescribeMacro{\kcal}
% \index{Energy&gt;kcal|usage}
% \index{Energy&gt;Calories|usage}
% \index{Energy&gt;calories|usage}
% |\kcal| is a macro for kilo-calories (kcal).
%
% \DescribeMacro{\Cal}
% \index{Energy&gt;kcal|usage}
% \index{Energy&gt;Calories|usage}
% \index{Energy&gt;calories|usage}
% |\Cal| is a macro for kilo=calories (Cal).
%
% \DescribeMacro{\calorie}
% \index{Energy&gt;kcal|usage}
% \index{Energy&gt;Calories|usage}
% \index{Energy&gt;calories|usage}
% |\calorie| is a macro for calories (cal).
% This macro accepts an optional argument for a prefix. If no option is 
% supplied, no prefix will be prepended.
%
% \DescribeMacro{\BTU}
% \index{Energy&gt;BTU|usage}
% |\BTU| is a macro for British Thermal Units (BTU).
%
% \DescribeMacro{\tnt}
% \index{Energy&gt;TNT|usage}
% |\tnt| is a macro for tons of TNT.
% \index{Energy|usage)}
%
% \subsection{Power}
% \index{Power|usage(}
%
% \DescribeMacro{\Watt}
% \index{Power&gt;Watts|usage}
% |\Watt| is a macro for Watts (W).
% This macro accepts an optional argument for a prefix. If no option is 
% supplied, no prefix will be prepended.
%
% \DescribeMacro{\hpi}
% \index{Power&gt;Horsepower|usage}
% \index{Power&gt;Horsepower&gt;Imperial|usage}
% |\hpi| is a macro for Imperial Horsepower (hp(I)).
%
% \DescribeMacro{\hpi}
% \index{Power&gt;Horsepower|usage}
% \index{Power&gt;Horsepower&gt;Metric|usage}
% |\hpi| is a macro for Metric Horsepower (hp(M)).
%
% \DescribeMacro{\hp}
% \index{Power&gt;Horsepower|usage}
% |\hp| is a macro for Horsepower (hp).
% \index{Power|usage)}
%
% \subsection{Distance}
% \index{Distance|usage)}
%
% \DescribeMacro{\meter}
% \index{Distance&gt;Meter|usage}
% |\meter| is a macro for meters (m).
% This macro accepts an optional argument for a prefix. If no option is 
% supplied, no prefix will be prepended.
%
% \DescribeMacro{\m}
% \index{Distance&gt;Meter|usage}
% |\m| is a macro for meters (m).
% This macro accepts an optional argument for a prefix. If no option is 
% supplied, no prefix will be prepended.
%
% \DescribeMacro{\km}
% \index{Distance&gt;Meter&gt;Kilometer|usage}
% |\km| is a macro for kilometers (km).
%
% \DescribeMacro{\au}
% \index{Distance&gt;Astronomical Unit|usage}
% |\au| is a macro for astronmical units (au).
%
% \DescribeMacro{\pc}
% \index{Distance&gt;Parsec|usage}
% |\pc| is a macro for parsecs (pc).
% This macro accepts an optional argument for a prefix. If no option is 
% supplied, no prefix will be prepended.
%
% \DescribeMacro{\ly}
% \index{Distance&gt;Light Years|usage}
% |\ly| is a macro for light-years (ly).
% This macro accepts an optional argument for a prefix. If no option is 
% supplied, no prefix will be prepended.
%
% \DescribeMacro{\cm}
% \index{Distance&gt;Meter&gt;Centimeter|usage}
% |\cm| is a macro for centimeters (cm).
%
% \DescribeMacro{\nm}
% \index{Distance&gt;Meter&gt;Nanometer|usage}
% |\nm| is a macro for nanometers (nm).
%
% \DescribeMacro{\ft}
% \index{Distance&gt;Imperial&gt;Feet|usage}
% |\ft| is a macro for feet (ft).
%
% \DescribeMacro{\inch}
% \index{Distance&gt;Imperial&gt;Inch|usage}
% |\inch| is a macro for inches (in).
%
% \DescribeMacro{\mi}
% \index{Distance&gt;Imperial&gt;Mile|usage}
% |\mi| is a macro for miles (mi).
%
% \index{Distance|usage)}
%
% \subsection{Time}
% \index{Time|usage(}
%
% \DescribeMacro{\s}
% \index{Time&gt;Seconds|usage}
% |\s| is a macro for seconds (s).
% This macro accepts an optional argument for a prefix. If no option is 
% supplied, no prefix will be prepended.
%
% \DescribeMacro{\Sec}
% \index{Time&gt;Seconds|usage}
% |\Sec| is a macro for seconds (s).
% This macro accepts an optional argument for a prefix. If no option is 
% supplied, no prefix will be prepended.
%
% \DescribeMacro{\Min}
% \index{Time&gt;Minutes|usage}
% |\Min| is a macro for minutes (m).
%
% \DescribeMacro{\h}
% \index{Time&gt;Hours|usage}
% |\h| is a macro for hours (h).
%
% \DescribeMacro{\y}
% \index{Time&gt;Years|usage}
% |\y| is a macro for years (y).
% This macro accepts an optional argument for a prefix. If no option is 
% supplied, no prefix will be prepended.
%
% \DescribeMacro{\Day}
% \index{Time&gt;Days|usage}
% |\Day| is a macro for days (d).
%
% \index{Time|usage)}
%
% \subsection{Mass}
%
% \index{Mass|usage(}
%
% \DescribeMacro{\gm}
% \index{Mass&gt;Grams|usage}
% |\gm| is a macro for grams (g).
% This macro accepts an optional argument for a prefix. If no option is 
% supplied, no prefix will be prepended.
%
% \DescribeMacro{\kg}
% \index{Mass&gt;Gram&gt;Kilograms|usage}
% |\kg| is a macro for kilograms (kg).
%
% \DescribeMacro{\lb}
% \index{Mass&gt;Pounds|usage}
% |\lb| is a macro for pounds (weight) (lb).
%
% \DescribeMacro{\amu}
% \index{Mass&gt;AMU|usage}
% \index{Mass&gt;Dalton|usage}
% |\amu| is a macro for atomic mass units (amu).
%
% \index{Mass|usage)}
%
% \subsection{Force}
%
% \index{Force|usage(}
%
% \DescribeMacro{\N}
% \index{Force&gt;Newton|usage}
% |\N| is a macro for Newtons (N).
% This macro accepts an optional argument for a prefix. If no option is 
% supplied, no prefix will be prepended.
%
% \DescribeMacro{\Newton}
% \index{Force&gt;Newton|usage}
% |\Newton| is a macro for Newtons (N).
% This macro accepts an optional argument for a prefix. If no option is 
% supplied, no prefix will be prepended.
%
% \DescribeMacro{\dyne}
% \index{Force&gt;Dyne|usage}
% |\dyne| is a macro for dynes (dyn).
% This macro accepts an optional argument for a prefix. If no option is 
% supplied, no prefix will be prepended.
%
% \DescribeMacro{\lbf}
% \index{Force&gt;Pounds|usage}
% |\lbf| is a macro for pounds of force (lbf).
%
% \index{Force|usage)}
%
% \subsection{Velocity}
%
% \index{Velocity|usage(}
%
% \DescribeMacro{\kmps}
% \index{Velocity&gt;Kilometers per Second|usage}
% |\kmps| is a macro for kilometers per second ($\kmps$).
%
% \DescribeMacro{\kmph}
% \index{Velocity&gt;Kilometers per Hour|usage}
% |\kmph| is a macro for kilometers per hour ($\kmph$).
%
% \DescribeMacro{\mps}
% \index{Velocity&gt;Meters per Second|usage}
% |\mps| is a macro for meters per second ($\mps$).
% This macro accepts an optional argument for a prefix. If no option is 
% supplied, no prefix will be prepended.
%
% \DescribeMacro{\miph}
% \index{Velocity&gt;Miles per Hour|usage}
% |\miph| is a macro for miles per hour ($\miph$).
%
% \DescribeMacro{\kts}
% \index{Velocity&gt;Knots|usage}
% \index{Velocity&gt;Nautical Miles per Hour|usage}
% |\kts| is a macro for knots ($\kts$)., i.e. nautical miles per hour
%
% \index{Velocity|usage)}
%
% \subsection{Acceleration}
%
% \index{Acceleration|usage(}
%
% \DescribeMacro{\mpss}
% \index{Acceleration&gt;Meters per Second squared|usage}
% |\mpss| is a macro for acceleration in meters per second squared ($\mpss$).
% This macro accepts an optional argument for a prefix. If no option is 
% supplied, no prefix will be prepended.
%
% \DescribeMacro{\gacc}
% \index{Acceleration&gt;Gravity|usage}
% |\gacc| is a macro for acceleration due to gravity ($\gacc$).
%
% \DescribeMacro{\ftpss}
% \index{Acceleration&gt;Feet per Second squared|usage}
% |\ftpss| is a macro for acceleration in feet per second squared ($\ftpss$).
%
% \index{Velocity|usage)}
%
%
% \subsection{Temperature}
%
% \index{Temperature|usage(}
%
% \DescribeMacro{\K}
% \index{Temperature&gt;Kelvin|usage}
% |\K| is a macro for Kelvin (K).
% This macro accepts an optional argument for a prefix. If no option is 
% supplied, no prefix will be prepended.
%
% \DescribeMacro{\Kelvin}
% \index{Temperature&gt;Kelvin|usage}
% |\Kelvin| is a macro for Kelvin (K).
% This macro accepts an optional argument for a prefix. If no option is 
% supplied, no prefix will be prepended.
%
% \changes{v1.1.0}{2020/11/02}{Corrected spelling of Celsius.}
% \changes{v1.2.0}{2020/03/26}{Added centigrade.}
% \DescribeMacro{\Celsius}
% \index{Temperature&gt;Celsius|usage}
% |\Celsius| is a macro for degrees Celsius $(\Celsius)$.
% |\Celcius| and |\centigrade| are identical macros $(\Celsius)$.
%
% \DescribeMacro{\Rankine}
% \index{Temperature&gt;Rankine|usage}
% |\Rankine| is a macro for degrees Rankine $(\Rankine)$.
%
% \DescribeMacro{\Fahrenheit}
% \index{Temperature&gt;Fahrenheit|usage}
% |\Fahrenheit| is a macro for degrees Fahrenheit $(\Fahrenheit)$.
%
% \index{Temperature|usage)}
%
% \subsection{Angular Velocity}
%
% \index{Angular Velocity|usage(}
%
% \DescribeMacro{\rpm}
% \index{Angular Velocity&gt;RPM|usage}
% |\rpm| is a macro for revolutions per minute $(\rpm)$.
%
% \index{Angular Velocity|usage)}
%
% \subsection{Frequency}
%
% \index{Frequency|usage(}
%
% \DescribeMacro{\Hz}
% \index{Frequency&gt;Hertz|usage}
% |\Hz| is a macro for Hertz (Hz).
% This macro accepts an optional argument for a prefix. If no option is 
% supplied, no prefix will be prepended.
%
% \index{Frequency|usage)}
%
%
% \subsection{Pressure}
%
% \index{Pressure|usage(}
%
% \DescribeMacro{\barP}
% \index{Pressure&gt;bar|usage}
% |\barP| is a macro for bar (bar). (The use of barP instead of just bar is due
% the \LaTeX~command \textbackslash bar.)
% This macro accepts an optional argument for a prefix. If no option is 
% supplied, no prefix will be prepended.
%
% \DescribeMacro{\atm}
% \index{Pressure&gt;atmosphere|usage}
% |\atm| is a macro for atmosphere (atm).
%
% \DescribeMacro{\Pa}
% \index{Pressure&gt;Pascal|usage}
% |\Pa| is a macro for Pascals (Pa).
% This macro accepts an optional argument for a prefix. If no option is 
% supplied, no prefix will be prepended.
%
% \DescribeMacro{\mmHg}
% \index{Pressure&gt;mm Hg|usage}
% |\mmHg| is a macro for millimeters of mercury (mmHg).
%
% \DescribeMacro{\inHg}
% \index{Pressure&gt;in Hg|usage}
% |\inHg| is a macro for inches of mercury (inHg).
%
% \DescribeMacro{\lbsi}
% \index{Pressure&gt;psi|usage}
% \index{Pressure&gt;Pound per square inch|usage}
% |\lbsi| is a macro for pounds per square inch (psi). (Note that \textbackslash
% psi is a latex command for the greek letter $\psi$).
%
% \DescribeMacro{\lbsf}
% \index{Pressure&gt;psf|usage}
% \index{Pressure&gt;Pound per square foot|usage}
% |\lbsf| is a macro for pounds per square foot (psf).
%
% \DescribeMacro{\Ba}
% \index{Pressure&gt;Barre|usage}
% |\Ba| is a macro for Barre (Ba).
% This macro accepts an optional argument for a prefix. If no option is 
% supplied, no prefix will be prepended.
%
% \DescribeMacro{\Torr}
% \index{Pressure&gt;Torr|usage}
% |\Torr| is a macro for Torr (Torr).
% This macro accepts an optional argument for a prefix. If no option is 
% supplied, no prefix will be prepended.
%
% \index{Pressure|usage)}
%
% \subsection{Other}
%
% \index{Other|usage(}
%
% \DescribeMacro{\mol}
% \index{Other&gt;mole|usage(}
% \index{mole|usage(}
% |\mol| is a macro for moles (mol).
%
% \index{Other|usage)}

% \StopEventually{}
%

\makeatletter
% \section{Implementation}
%
% \subsection{Special}
%
%\iffalse
%&lt;*package&gt;
%\fi
% \begin{macro}{\units@separator}
% |\units@separator| is a special macro used to set the spacing between a
% quantity and the associated units.
%
%    \begin{macrocode}
\DeclareRobustCommand{\units@separator}{\,}
%    \end{macrocode}
% \end{macro}
%\iffalse
%&lt;/package&gt;
%\fi
%
%\iffalse
%&lt;*package&gt;
%\fi
% \begin{macro}{\micro}
% \changes{v1.0.4}{2020/03/26}{Corrected version number and date in 
% documentation}
% |\micro| is a special macro used to typeset the symbol \textbackslash mu.
% It is compatable with the \textbackslash micro in siunitx.
%
%    \begin{macrocode}
\ifx\micro\undefined
\DeclareRobustCommand{\micro}{\ensuremath{%
\mu}}
\fi
%    \end{macrocode}
% \end{macro}
%\iffalse
%&lt;/package&gt;
%\fi
%
%
% \subsection{Electricity \&amp; Magnetism}
%
%\iffalse
%&lt;*package&gt;
%\fi
% \begin{macro}{\V}
% |\V| is a macro for Volts (V).
% This macro accepts an optional argument for a prefix. If no option is 
% supplied, no prefix will be prepended.
%
%    \begin{macrocode}
\DeclareRobustCommand{\V}[1][ ]{\ensuremath{%
\expandafter\units@separator\mathrm{#1V}}}
%    \end{macrocode}
% \end{macro}
%\iffalse
%&lt;/package&gt;
%\fi
%
%\iffalse
%&lt;*package&gt;
%\fi
% \begin{macro}{\Volt}
% |\Volt| is a macro for Volts (V).
% This macro accepts an optional argument for a prefix. If no option is 
% supplied, no prefix will be prepended.
%
%    \begin{macrocode}
\DeclareRobustCommand{\Volt}[1][ ]{\ensuremath{%
\expandafter\units@separator\mathrm{#1V}}}
%    \end{macrocode}
% \end{macro}
%\iffalse
%&lt;/package&gt;
%\fi
%
%\iffalse
%&lt;*package&gt;
%\fi
% \begin{macro}{\Coulomb}
% |\Coulomb| is a macro for Coulombs (C).
% This macro accepts an optional argument for a prefix. If no option is 
% supplied, no prefix will be prepended.
%
%    \begin{macrocode}
\DeclareRobustCommand{\Coulomb}[1][ ]{\ensuremath{%
\expandafter\units@separator\mathrm{#1C}}}
%    \end{macrocode}
% \end{macro}
%\iffalse
%&lt;/package&gt;
%\fi
%
%\iffalse
%&lt;*package&gt;
%\fi
% \begin{macro}{\esu}
% |\esu| is a macro for electrostatic units (esu).
%
%    \begin{macrocode}
\DeclareRobustCommand{\esu}{\ensuremath{%
\expandafter\units@separator\mathrm{esu}}}
%    \end{macrocode}
% \end{macro}
%\iffalse
%&lt;/package&gt;
%\fi
%
%\iffalse
%&lt;*package&gt;
%\fi
% \begin{macro}{\Ohm}
% |\Ohm| is a macro for Ohms ($\Omega$).
% This macro accepts an optional argument for a prefix. If no option is 
% supplied, no prefix will be prepended.
%
%    \begin{macrocode}
\DeclareRobustCommand{\Ohm}[1][ ]{\ensuremath{%
\expandafter\units@separator\mathrm{#1\Omega}}}
%    \end{macrocode}
% \end{macro}
%\iffalse
%&lt;/package&gt;
%\fi
%
%\iffalse
%&lt;*package&gt;
%\fi
% \begin{macro}{\Amp}
% |\Amp| is a macro for Amperes (A).
% This macro accepts an optional argument for a prefix. If no option is 
% supplied, no prefix will be prepended.
%
%    \begin{macrocode}
\DeclareRobustCommand{\Amp}[1][ ]{\ensuremath{%
\expandafter\units@separator\mathrm{#1A}}}
%    \end{macrocode}
% \end{macro}
%\iffalse
%&lt;/package&gt;
%\fi
%
%\iffalse
%&lt;*package&gt;
%\fi
% \begin{macro}{\Farad}
% |\Farad| is a macro for Farads (F).
% This macro accepts an optional argument for a prefix. If no option is 
% supplied, no prefix will be prepended.
%
%    \begin{macrocode}
\DeclareRobustCommand{\Farad}[1][ ]{\ensuremath{%
\expandafter\units@separator\mathrm{#1F}}}
%    \end{macrocode}
% \end{macro}
%\iffalse
%&lt;/package&gt;
%\fi
%
%\iffalse
%&lt;*package&gt;
%\fi
% \begin{macro}{\Tesla}
% |\Tesla| is a macro for Teslas (T).
% This macro accepts an optional argument for a prefix. If no option is 
% supplied, no prefix will be prepended.
%
%    \begin{macrocode}
\DeclareRobustCommand{\Tesla}[1][ ]{\ensuremath{%
\expandafter\units@separator\mathrm{#1T}}}
%    \end{macrocode}
% \end{macro}
%\iffalse
%&lt;/package&gt;
%\fi
%
%\iffalse
%&lt;*package&gt;
%\fi
% \begin{macro}{\Gauss}
% |\Gauss| is a macro for Gauss (G).
% This macro accepts an optional argument for a prefix. If no option is 
% supplied, no prefix will be prepended.
%
%    \begin{macrocode}
\DeclareRobustCommand{\Gauss}[1][ ]{\ensuremath{%
\expandafter\units@separator\mathrm{#1G}}}
%    \end{macrocode}
% \end{macro}
%\iffalse
%&lt;/package&gt;
%\fi
%
%\iffalse
%&lt;*package&gt;
%\fi
% \begin{macro}{\Henry}
% |\Henry| is a macro for Henrys (H).
% This macro accepts an optional argument for a prefix. If no option is 
% supplied, no prefix will be prepended.
%
%    \begin{macrocode}
\DeclareRobustCommand{\Henry}[1][ ]{\ensuremath{%
\expandafter\units@separator\mathrm{#1H}}}
%    \end{macrocode}
% \end{macro}
%\iffalse
%&lt;/package&gt;
%\fi
%
% \subsection{Energy}
%
%\iffalse
%&lt;*package&gt;
%\fi
% \begin{macro}{\eV}
% |\eV| is a macro for electron Volts (eV).
% This macro accepts an optional argument for a prefix. If no option is 
% supplied, no prefix will be prepended.
%
%    \begin{macrocode}
\DeclareRobustCommand{\eV}[1][ ]{\ensuremath{%
\expandafter\units@separator\mathrm{#1eV}}}
%    \end{macrocode}
% \end{macro}
%\iffalse
%&lt;/package&gt;
%\fi
%
%\iffalse
%&lt;*package&gt;
%\fi
% \begin{macro}{\keV}
% |\keV| is a macro for kilo-electron Volts (keV).
%
%    \begin{macrocode}
\DeclareRobustCommand{\keV}{\ensuremath{%
\expandafter\units@separator\mathrm{keV}}}
%    \end{macrocode}
% \end{macro}
%\iffalse
%&lt;/package&gt;
%\fi
%
%\iffalse
%&lt;*package&gt;
%\fi
% \begin{macro}{\MeV}
% |\MeV| is a macro for mega-electron Volts (MeV).
%
%    \begin{macrocode}
\DeclareRobustCommand{\MeV}{\ensuremath{%
\expandafter\units@separator\mathrm{MeV}}}
%    \end{macrocode}
% \end{macro}
%\iffalse
%&lt;/package&gt;
%\fi
%
%\iffalse
%&lt;*package&gt;
%\fi
% \begin{macro}{\J}
% |\J| is a macro for Joules (J).
% This macro accepts an optional argument for a prefix. If no option is 
% supplied, no prefix will be prepended.
%
%    \begin{macrocode}
\DeclareRobustCommand{\J}[1][ ]{\ensuremath{%
\expandafter\units@separator\mathrm{#1J}}}
%    \end{macrocode}
% \end{macro}
%\iffalse
%&lt;/package&gt;
%\fi
%
%\iffalse
%&lt;*package&gt;
%\fi
% \begin{macro}{\Joule}
% |\Joule| is a macro for Joules (J).
% This macro accepts an optional argument for a prefix. If no option is 
% supplied, no prefix will be prepended.
%
%    \begin{macrocode}
\DeclareRobustCommand{\Joule}[1][ ]{\ensuremath{%
\expandafter\units@separator\mathrm{#1J}}}
%    \end{macrocode}
% \end{macro}
%\iffalse
%&lt;/package&gt;
%\fi
%
%\iffalse
%&lt;*package&gt;
%\fi
% \begin{macro}{\erg}
% |\erg| is a macro for ergs (erg).
%
%    \begin{macrocode}
\DeclareRobustCommand{\erg}{\ensuremath{%
\expandafter\units@separator\mathrm{erg}}}
%    \end{macrocode}
% \end{macro}
%\iffalse
%&lt;/package&gt;
%\fi
%
%\iffalse
%&lt;*package&gt;
%\fi
% \begin{macro}{\kcal}
% \changes{v1.0.4}{2020/03/26}{kcal appeared to take a prefix, but the prefix
% was ignored; removed the prefix.}
% |\kcal| is a macro for kilo-calories (kcal).
%
%    \begin{macrocode}
\DeclareRobustCommand{\kcal}{\ensuremath{%
\expandafter\units@separator\mathrm{kcal}}}
%    \end{macrocode}
% \end{macro}
%\iffalse
%&lt;/package&gt;
%\fi
%
%\iffalse
%&lt;*package&gt;
%\fi
% \begin{macro}{\Cal}
% |\Cal| is a macro for kilo=calories (Cal).
%
%    \begin{macrocode}
\DeclareRobustCommand{\Cal}{\ensuremath{%
\expandafter\units@separator\mathrm{Cal}}}
%    \end{macrocode}
% \end{macro}
%\iffalse
%&lt;/package&gt;
%\fi
%
%\iffalse
%&lt;*package&gt;
%\fi
% \begin{macro}{\calorie}
% |\calorie| is a macro for calories (cal).
% This macro accepts an optional argument for a prefix. If no option is 
% supplied, no prefix will be prepended.
%
%    \begin{macrocode}
\DeclareRobustCommand{\calorie}[1][ ]{%
\ensuremath{%
\expandafter\units@separator\mathrm{#1cal}}}
%    \end{macrocode}
% \end{macro}
%\iffalse
%&lt;/package&gt;
%\fi
%
%\iffalse
%&lt;*package&gt;
%\fi
% \begin{macro}{\BTU}
% |\BTU| is a macro for British Thermal Units (BTU).
%
%    \begin{macrocode}
\DeclareRobustCommand{\BTU}{\ensuremath{%
\expandafter\units@separator\mathrm{BTU}}}
%    \end{macrocode}
% \end{macro}
%\iffalse
%&lt;/package&gt;
%\fi
%
%\iffalse
%&lt;*package&gt;
%\fi
% \begin{macro}{\tnt}
% |\tnt| is a macro for tons of TNT).
%
%    \begin{macrocode}
\DeclareRobustCommand{\tnt}{\ensuremath{%
\expandafter\units@separator\mathrm{ton%
\expandafter\units@separator of%
\expandafter\units@separator TNT}}}
%    \end{macrocode}
% \end{macro}
%\iffalse
%&lt;/package&gt;
%\fi
%
%
% \subsection{Power}
%
%\iffalse
%&lt;*package&gt;
%\fi
% \begin{macro}{\Watt}
% |\Watt| is a macro for Watts (W).
% This macro accepts an optional argument for a prefix. If no option is 
% supplied, no prefix will be prepended.
%
%    \begin{macrocode}
\DeclareRobustCommand{\Watt}[1][ ]{\ensuremath{%
\expandafter\units@separator\mathrm{#1W}}}
%    \end{macrocode}
% \end{macro}
%\iffalse
%&lt;/package&gt;
%\fi
%
%\iffalse
%&lt;*package&gt;
%\fi
% \begin{macro}{\hpi}
% |\hpi| is a macro for Imperial Horsepower (hp(I)).
%
%    \begin{macrocode}
\DeclareRobustCommand{\hpi}{\ensuremath{%
\expandafter\units@separator\mathrm{hp(I)}}}
%    \end{macrocode}
% \end{macro}
%\iffalse
%&lt;/package&gt;
%\fi
%
%\iffalse
%&lt;*package&gt;
%\fi
% \begin{macro}{\hpi}
% |\hpi| is a macro for Metric Horsepower (hp(M)).
%
%    \begin{macrocode}
\DeclareRobustCommand{\hpm}{\ensuremath{%
\expandafter\units@separator\mathrm{hp(M)}}}
%    \end{macrocode}
% \end{macro}
%\iffalse
%&lt;/package&gt;
%\fi
%
%\iffalse
%&lt;*package&gt;
%\fi
% \begin{macro}{\hp}
% |\hp| is a macro for Horsepower (hp).
%
%    \begin{macrocode}
\DeclareRobustCommand{\hp}{\ensuremath{%
\expandafter\units@separator\mathrm{hp}}}
%    \end{macrocode}
% \end{macro}
%\iffalse
%&lt;/package&gt;
%\fi
%
%
% \subsection{Distance}
%
%\iffalse
%&lt;*package&gt;
%\fi
% \begin{macro}{\meter}
% |\meter| is a macro for meters (m).
% This macro accepts an optional argument for a prefix. If no option is 
% supplied, no prefix will be prepended.
%
%    \begin{macrocode}
\DeclareRobustCommand{\meter}[1][ ]{\ensuremath{%
\expandafter\units@separator\mathrm{#1m}}}
%    \end{macrocode}
% \end{macro}
%\iffalse
%&lt;/package&gt;
%\fi
%
%\iffalse
%&lt;*package&gt;
%\fi
% \begin{macro}{\m}
% |\m| is a macro for meters (m).
% This macro accepts an optional argument for a prefix. If no option is 
% supplied, no prefix will be prepended.
%
%    \begin{macrocode}
\DeclareRobustCommand{\m}[1][ ]{\ensuremath{%
\expandafter\units@separator\mathrm{#1m}}}
%    \end{macrocode}
% \end{macro}
%\iffalse
%&lt;/package&gt;
%\fi
%
%\iffalse
%&lt;*package&gt;
%\fi
% \begin{macro}{\km}
% |\km| is a macro for kilometers (km).
%
%    \begin{macrocode}
\DeclareRobustCommand{\km}{\ensuremath{%
\expandafter\units@separator\mathrm{km}}}
%    \end{macrocode}
% \end{macro}
%\iffalse
%&lt;/package&gt;
%\fi
%
%\iffalse
%&lt;*package&gt;
%\fi
% \begin{macro}{\au}
% |\au| is a macro for astronmical units (au).
%
%    \begin{macrocode}
\DeclareRobustCommand{\au}{\ensuremath{%
\expandafter\units@separator\mathrm{au}}}
%    \end{macrocode}
% \end{macro}
%\iffalse
%&lt;/package&gt;
%\fi
%
%\iffalse
%&lt;*package&gt;
%\fi
% \begin{macro}{\pc}
% |\pc| is a macro for parsecs (pc).
% This macro accepts an optional argument for a prefix. If no option is 
% supplied, no prefix will be prepended.
%
%    \begin{macrocode}
\DeclareRobustCommand{\pc}[1][ ]{\ensuremath{%
\expandafter\units@separator\mathrm{#1pc}}}
%    \end{macrocode}
% \end{macro}
%\iffalse
%&lt;/package&gt;
%\fi
%
%\iffalse
%&lt;*package&gt;
%\fi
% \begin{macro}{\ly}
% |\ly| is a macro for light-years (ly).
% This macro accepts an optional argument for a prefix. If no option is 
% supplied, no prefix will be prepended.
%
%    \begin{macrocode}
\DeclareRobustCommand{\ly}[1][ ]{\ensuremath{%
\expandafter\units@separator\mathrm{#1ly}}}
%    \end{macrocode}
% \end{macro}
%\iffalse
%&lt;/package&gt;
%\fi
%
%\iffalse
%&lt;*package&gt;
%\fi
% \begin{macro}{\cm}
% |\cm| is a macro for centimeters (cm).
%
%    \begin{macrocode}
\DeclareRobustCommand{\cm}{\ensuremath{%
\expandafter\units@separator\mathrm{cm}}}
%    \end{macrocode}
% \end{macro}
%\iffalse
%&lt;/package&gt;
%\fi
%
%\iffalse
%&lt;*package&gt;
%\fi
% \begin{macro}{\nm}
% |\nm| is a macro for nanometers (nm).
%
%    \begin{macrocode}
\DeclareRobustCommand{\nm}{\ensuremath{%
\expandafter\units@separator\mathrm{nm}}}
%    \end{macrocode}
% \end{macro}
%\iffalse
%&lt;/package&gt;
%\fi
%
%\iffalse
%&lt;*package&gt;
%\fi
% \begin{macro}{\ft}
% |\ft| is a macro for feet (ft).
%
%    \begin{macrocode}
\DeclareRobustCommand{\ft}{\ensuremath{%
\expandafter\units@separator\mathrm{ft}}}
%    \end{macrocode}
% \end{macro}
%\iffalse
%&lt;/package&gt;
%\fi
%
%\iffalse
%&lt;*package&gt;
%\fi
% \begin{macro}{\inch}
% |\inch| is a macro for inches (in).
%
%    \begin{macrocode}
\DeclareRobustCommand{\inch}{\ensuremath{%
\expandafter\units@separator\mathrm{in}}}
%    \end{macrocode}
% \end{macro}
%\iffalse
%&lt;/package&gt;
%\fi
%
%\iffalse
%&lt;*package&gt;
%\fi
% \begin{macro}{\mi}
% |\mi| is a macro for miles (mi).
%
%    \begin{macrocode}
\DeclareRobustCommand{\mi}{\ensuremath{%
\expandafter\units@separator\mathrm{mi}}}
%    \end{macrocode}
% \end{macro}
%\iffalse
%&lt;/package&gt;
%\fi
%
%
% \subsection{Time}
%
%\iffalse
%&lt;*package&gt;
%\fi
% \begin{macro}{\s}
% |\s| is a macro for seconds (s).
% This macro accepts an optional argument for a prefix. If no option is 
% supplied, no prefix will be prepended.
%
%    \begin{macrocode}
\DeclareRobustCommand{\s}[1][ ]{\ensuremath{%
\expandafter\units@separator\mathrm{#1s}}}
%    \end{macrocode}
% \end{macro}
%\iffalse
%&lt;/package&gt;
%\fi
%
%\iffalse
%&lt;*package&gt;
%\fi
% \begin{macro}{\Sec}
% |\Sec| is a macro for seconds (s).
% This macro accepts an optional argument for a prefix. If no option is 
% supplied, no prefix will be prepended.
%
%    \begin{macrocode}
\DeclareRobustCommand{\Sec}[1][ ]{\ensuremath{%
\expandafter\units@separator\mathrm{#1s}}}
%    \end{macrocode}
% \end{macro}
%\iffalse
%&lt;/package&gt;
%\fi
%
%\iffalse
%&lt;*package&gt;
%\fi
% \begin{macro}{\Min}
% |\Min| is a macro for minutes (m).
%
%    \begin{macrocode}
\DeclareRobustCommand{\Min}{\ensuremath{%
\expandafter\units@separator\mathrm{min}}}
%    \end{macrocode}
% \end{macro}
%\iffalse
%&lt;/package&gt;
%\fi
%
%\iffalse
%&lt;*package&gt;
%\fi
% \begin{macro}{\h}
% |\h| is a macro for hours (h).
%
%    \begin{macrocode}
\DeclareRobustCommand{\h}{\ensuremath{%
\expandafter\units@separator\mathrm{h}}}
%    \end{macrocode}
% \end{macro}
%\iffalse
%&lt;/package&gt;
%\fi
%
%\iffalse
%&lt;*package&gt;
%\fi
% \begin{macro}{\y}
% |\y| is a macro for years (y).
% This macro accepts an optional argument for a prefix. If no option is 
% supplied, no prefix will be prepended.
%
%    \begin{macrocode}
\DeclareRobustCommand{\y}[1][ ]{\ensuremath{%
\expandafter\units@separator\mathrm{#1y}}}
%    \end{macrocode}
% \end{macro}
%\iffalse
%&lt;/package&gt;
%\fi
%
%\iffalse
%&lt;*package&gt;
%\fi
% \begin{macro}{\Day}
% |\Day| is a macro for days (d).
%
%    \begin{macrocode}
\DeclareRobustCommand{\Day}{\ensuremath{%
\expandafter\units@separator\mathrm{d}}}
%    \end{macrocode}
% \end{macro}
%\iffalse
%&lt;/package&gt;
%\fi
%
%
% \subsection{Mass}
%
%\iffalse
%&lt;*package&gt;
%\fi
% \begin{macro}{\gm}
% |\gm| is a macro for grams (g).
% This macro accepts an optional argument for a prefix. If no option is 
% supplied, no prefix will be prepended.
%
%    \begin{macrocode}

\DeclareRobustCommand{\gm}[1][ ]{\ensuremath{%
\expandafter\units@separator\mathrm{#1g}}}
%    \end{macrocode}
% \end{macro}
%\iffalse
%&lt;/package&gt;
%\fi
%
%\iffalse
%&lt;*package&gt;
%\fi
% \begin{macro}{\kg}
% |\kg| is a macro for kilograms (kg).
%
%    \begin{macrocode}
\DeclareRobustCommand{\kg}{\ensuremath{%
\expandafter\units@separator\mathrm{kg}}}
%    \end{macrocode}
% \end{macro}
%\iffalse
%&lt;/package&gt;
%\fi
%
%\iffalse
%&lt;*package&gt;
%\fi
% \begin{macro}{\lb}
% |\lb| is a macro for pounds (weight) (lb).
%
%    \begin{macrocode}
\DeclareRobustCommand{\lb}{\ensuremath{%
\expandafter\units@separator\mathrm{lb}}}
%    \end{macrocode}
% \end{macro}
%\iffalse
%&lt;/package&gt;
%\fi
%
%\iffalse
%&lt;*package&gt;
%\fi
% \begin{macro}{\amu}
% |\amu| is a macro for atomic mass units (amu).
%
%    \begin{macrocode}
\DeclareRobustCommand{\amu}{\ensuremath{%
\expandafter\units@separator\mathrm{amu}}}
%    \end{macrocode}
% \end{macro}
%\iffalse
%&lt;/package&gt;
%\fi
%
%
% \subsection{Force}
%
%\iffalse
%&lt;*package&gt;
%\fi
% \begin{macro}{\N}
% |\N| is a macro for Newtons (N).
% This macro accepts an optional argument for a prefix. If no option is 
% supplied, no prefix will be prepended.
%
%    \begin{macrocode}
\DeclareRobustCommand{\N}[1][ ]{\ensuremath{%
\expandafter\units@separator\mathrm{#1N}}}
%    \end{macrocode}
% \end{macro}
%\iffalse
%&lt;/package&gt;
%\fi
%
%\iffalse
%&lt;*package&gt;
%\fi
% \begin{macro}{\Newton}
% |\Newton| is a macro for Newtons (N).
% This macro accepts an optional argument for a prefix. If no option is 
% supplied, no prefix will be prepended.
%
%    \begin{macrocode}
\DeclareRobustCommand{\Newton}[1][ ]{\ensuremath{%
\expandafter\units@separator\mathrm{#1N}}}
%    \end{macrocode}
% \end{macro}
%\iffalse
%&lt;/package&gt;
%\fi
%
%\iffalse
%&lt;*package&gt;
%\fi
% \begin{macro}{\dyne}
% |\dyne| is a macro for dynes (dyn).
% This macro accepts an optional argument for a prefix. If no option is 
% supplied, no prefix will be prepended.
%
%    \begin{macrocode}
\DeclareRobustCommand{\dyne}[1][ ]{\ensuremath{%
\expandafter\units@separator\mathrm{#1dyn}}}
%    \end{macrocode}
% \end{macro}
%\iffalse
%&lt;/package&gt;
%\fi
%
%\iffalse
%&lt;*package&gt;
%\fi
% \begin{macro}{\lbf}
% |\lbf| is a macro for pounds of force (lbf).
%
%    \begin{macrocode}
\DeclareRobustCommand{\lbf}{\ensuremath{%
\expandafter\units@separator\mathrm{lbf}}}
%    \end{macrocode}
% \end{macro}
%\iffalse
%&lt;/package&gt;
%\fi
%
%
% \subsection{Velocity}
%
%\iffalse
%&lt;*package&gt;
%\fi
% \begin{macro}{\kmps}
% |\kmps| is a macro for kilometers per second ($\kmps$).
%
%    \begin{macrocode}
\DeclareRobustCommand{\kmps}{\ensuremath{%
\expandafter\units@separator\mathrm{km}%
\expandafter\units@separator\mathrm{s}^{-1}}}
%    \end{macrocode}
% \end{macro}
%\iffalse
%&lt;/package&gt;
%\fi
%
%\iffalse
%&lt;*package&gt;
%\fi
% \begin{macro}{\kmph}
% |\kmph| is a macro for kilometers per hour ($\kmph$).
%
%    \begin{macrocode}
\DeclareRobustCommand{\kmph}{\ensuremath{%
\expandafter\units@separator\mathrm{km}%
\expandafter\units@separator\mathrm{h}^{-1}}}
%    \end{macrocode}
% \end{macro}
%\iffalse
%&lt;/package&gt;
%\fi
%
%\iffalse
%&lt;*package&gt;
%\fi
% \begin{macro}{\mps}
% |\mps| is a macro for meters per second ($\mps$).
% This macro accepts an optional argument for a prefix. If no option is 
% supplied, no prefix will be prepended.
%
%    \begin{macrocode}
\DeclareRobustCommand{\mps}[1][ ]{\ensuremath{%
\expandafter\units@separator\mathrm{#1m}%
\expandafter\units@separator\mathrm{s}^{-1}}}
%    \end{macrocode}
% \end{macro}
%\iffalse
%&lt;/package&gt;
%\fi
%
%\iffalse
%&lt;*package&gt;
%\fi
% \begin{macro}{\miph}
% |\miph| is a macro for miles per hour ($\miph$).
%
%    \begin{macrocode}
\DeclareRobustCommand{\miph}{\ensuremath{%
\expandafter\units@separator\mathrm{mi}%
\expandafter\units@separator\mathrm{h}^{-1}}}
%    \end{macrocode}
% \end{macro}
%\iffalse
%&lt;/package&gt;
%\fi
%
%\iffalse
%&lt;*package&gt;
%\fi
% \begin{macro}{\kts}
% |\kts| is a macro for knots ($\kts$).
%
%    \begin{macrocode}
\DeclareRobustCommand{\kts}{\ensuremath{%
\expandafter\units@separator\mathrm{kts}}}
%    \end{macrocode}
% \end{macro}
%\iffalse
%&lt;/package&gt;
%\fi
%
%
% \subsection{Acceleration}
%
%\iffalse
%&lt;*package&gt;
%\fi
% \begin{macro}{\mpss}
% |\mpss| is a macro for acceleration in meters per second squared ($\mpss$).
% This macro accepts an optional argument for a prefix. If no option is 
% supplied, no prefix will be prepended.
%
%    \begin{macrocode}

\DeclareRobustCommand{\mpss}[1][ ]{\ensuremath{%
\expandafter\units@separator\mathrm{#1m}%
\expandafter\units@separator\mathrm{s}^{-2}}}
%    \end{macrocode}
% \end{macro}
%\iffalse
%&lt;/package&gt;
%\fi
%
%\iffalse
%&lt;*package&gt;
%\fi
% \begin{macro}{\gacc}
% |\gacc| is a macro for acceleration due to gravity ($\gacc$).
%
%    \begin{macrocode}
\DeclareRobustCommand{\gacc}{\ensuremath{%
\expandafter\units@separator\mathrm{g}}}
%    \end{macrocode}
% \end{macro}
%\iffalse
%&lt;/package&gt;
%\fi
%
%\iffalse
%&lt;*package&gt;
%\fi
% \begin{macro}{\ftpss}
% |\ftpss| is a macro for acceleration in feet per second squared ($\ftpss$).
%
%    \begin{macrocode}
\DeclareRobustCommand{\ftpss}{\ensuremath{%
\expandafter\units@separator\mathrm{ft}%
\expandafter\units@separator\mathrm{s}^{-2}}}
%    \end{macrocode}
% \end{macro}
%\iffalse
%&lt;/package&gt;
%\fi
%
%
% \subsection{Temperature}
%
%\iffalse
%&lt;*package&gt;
%\fi
% \begin{macro}{\K}
% |\K| is a macro for Kelvin (K).
% This macro accepts an optional argument for a prefix. If no option is 
% supplied, no prefix will be prepended.
%
%    \begin{macrocode}
\DeclareRobustCommand{\K}[1][ ]{\ensuremath{%
\expandafter\units@separator\mathrm{#1K}}}
%    \end{macrocode}
% \end{macro}
%\iffalse
%&lt;/package&gt;
%\fi
%
%\iffalse
%&lt;*package&gt;
%\fi
% \begin{macro}{\Kelvin}
% |\Kelvin| is a macro for Kelvin (K).
% This macro accepts an optional argument for a prefix. If no option is 
% supplied, no prefix will be prepended.
%
%    \begin{macrocode}
\DeclareRobustCommand{\Kelvin}[1][ ]{\ensuremath{%
\expandafter\units@separator\mathrm{#1K}}}
%    \end{macrocode}
% \end{macro}
%\iffalse
%&lt;/package&gt;
%\fi
%
%\iffalse
%&lt;*package&gt;
%\fi
% \begin{macro}{\Celsius}
% \changes{v1.0.4}{2020/03/26}{had ${}^\circ$ outside of 
% ensuremath, causing problems for text mode. It is also more common to typeset
% the $^\circ$ with the unit instead of the number. Corrects both of these 
% issues}
% \changes{v1.1.0}{2020/11/02}{corrected spelling of Celsius and added
% duplicate macro with incorrect spelling (``Celcius'')}
% \changes{v1.2.0}{2021/03/26}{Added centigrade}
%
%    \begin{macrocode}
\DeclareRobustCommand{\Celsius}{\ensuremath{\expandafter\units@separator{}%
^\circ\mathrm{C}}}
\DeclareRobustCommand{\Celcius}{\Celsius}
\DeclareRobustCommand{\centigrade}{\Celsius}
%    \end{macrocode}
% \end{macro}
%\iffalse
%&lt;/package&gt;
%\fi
%
%\iffalse
%&lt;*package&gt;
%\fi
% \begin{macro}{\Rankine}
% \changes{v1.0.4}{2020/03/26}{had ${}^\circ$ outside of 
% ensuremath, causing problems for text mode. It is also more common to typeset
% the $^\circ$ with the unit instead of the number. Corrects both of these 
% issues}
% |\Rankine| is a macro for degrees Rankine $(\Rankine)$.
%
%    \begin{macrocode}
\DeclareRobustCommand{\Rankine}{\ensuremath{%
\expandafter\units@separator{}^\circ\mathrm{R}}}
%    \end{macrocode}
% \end{macro}
%\iffalse
%&lt;/package&gt;
%\fi
%
%\iffalse
%&lt;*package&gt;
%\fi
% \begin{macro}{\Fahrenheit}
% \changes{v1.0.4}{2020/03/26}{had ${}^\circ$ outside of 
% ensuremath, causing problems for text mode. It is also more common to typeset
% the $^\circ$ with the unit instead of the number. Corrects both of these 
% issues}
% |\Fahrenheit| is a macro for degrees Fahrenheit $(\Fahrenheit)$.
%
%    \begin{macrocode}
\DeclareRobustCommand{\Fahrenheit}{\ensuremath{%
\expandafter\units@separator{}^\circ\mathrm{F}}}
%    \end{macrocode}
% \end{macro}
%\iffalse
%&lt;/package&gt;
%\fi
%
%
% \subsection{Angular Velocity}
%
%\iffalse
%&lt;*package&gt;
%\fi
% \begin{macro}{\rpm}
% |\rpm| is a macro for revolutions per minute $(\rpm)$.
%
%    \begin{macrocode}

\DeclareRobustCommand{\rpm}{\ensuremath{%
\expandafter\units@separator\mathrm{rev}%
\expandafter\units@separator\Min^{-1}}}
%    \end{macrocode}
% \end{macro}
%\iffalse
%&lt;/package&gt;
%\fi
%
% \subsection{Frequency}
%
%\iffalse
%&lt;*package&gt;
%\fi
% \begin{macro}{\Hz}
% |\Hz| is a macro for Hertz (Hz).
% This macro accepts an optional argument for a prefix. If no option is 
% supplied, no prefix will be prepended.
%
%    \begin{macrocode}

\DeclareRobustCommand{\Hz}[1][ ]{\ensuremath{%
\expandafter\units@separator\mathrm{#1Hz}}}
%    \end{macrocode}
% \end{macro}
%\iffalse
%&lt;/package&gt;
%\fi
%
%
% \subsection{Pressure}
%
%\iffalse
%&lt;*package&gt;
%\fi
% \begin{macro}{\barP}
% |\barP| is a macro for bar (bar). (The use of barP instead of just bar is due
% the \LaTeX~command \textbackslash bar.)
% This macro accepts an optional argument for a prefix. If no option is 
% supplied, no prefix will be prepended.
%
%    \begin{macrocode}
\DeclareRobustCommand{\barP}[1][ ]{\ensuremath{%
\expandafter\units@separator\mathrm{#1bar}}}
%    \end{macrocode}
% \end{macro}
%\iffalse
%&lt;/package&gt;
%\fi
%
%\iffalse
%&lt;*package&gt;
%\fi
% \begin{macro}{\atm}
% |\atm| is a macro for atmosphere (atm).
%
%    \begin{macrocode}
\DeclareRobustCommand{\atm}{\ensuremath{%
\expandafter\units@separator\mathrm{atm}}}
%    \end{macrocode}
% \end{macro}
%\iffalse
%&lt;/package&gt;
%\fi
%
%\iffalse
%&lt;*package&gt;
%\fi
% \begin{macro}{\Pa}
% |\Pa| is a macro for Pascals (Pa).
% This macro accepts an optional argument for a prefix. If no option is 
% supplied, no prefix will be prepended.
%
%    \begin{macrocode}
\DeclareRobustCommand{\Pa}[1][ ]{\ensuremath{%
\expandafter\units@separator\mathrm{#1Pa}}}
%    \end{macrocode}
% \end{macro}
%\iffalse
%&lt;/package&gt;
%\fi
%
%\iffalse
%&lt;*package&gt;
%\fi
% \begin{macro}{\mmHg}
% |\mmHg| is a macro for millimeters of mercury (mmHg).
%
%    \begin{macrocode}
\DeclareRobustCommand{\mmHg}{\ensuremath{%
\expandafter\units@separator\mathrm{mmHg}}}
%    \end{macrocode}
% \end{macro}
%\iffalse
%&lt;/package&gt;
%\fi
%
%\iffalse
%&lt;*package&gt;
%\fi
% \begin{macro}{\inHg}
% |\inHg| is a macro for inches of mercury (inHg).
%
%    \begin{macrocode}
\DeclareRobustCommand{\inHg}{\ensuremath{%
\expandafter\units@separator\mathrm{inHg}}}
%    \end{macrocode}
% \end{macro}
%\iffalse
%&lt;/package&gt;
%\fi
%
%\iffalse
%&lt;*package&gt;
%\fi
% \begin{macro}{\lbsi}
% |\lbsi| is a macro for pounds per square inch (psi). (Note that \textbackslash
% psi is a latex command for the greek letter $\psi$).
%
%    \begin{macrocode}
\DeclareRobustCommand{\lbsi}{\ensuremath{%
\expandafter\units@separator\mathrm{psi}}}
%    \end{macrocode}
% \end{macro}
%\iffalse
%&lt;/package&gt;
%\fi
%
%\iffalse
%&lt;*package&gt;
%\fi
% \begin{macro}{\lbsf}
% |\lbsf| is a macro for pounds per square foot (psf).
%
%    \begin{macrocode}
\DeclareRobustCommand{\lbsf}{\ensuremath{%
\expandafter\units@separator\mathrm{psf}}}
%    \end{macrocode}
% \end{macro}
%\iffalse
%&lt;/package&gt;
%\fi
%
%\iffalse
%&lt;*package&gt;
%\fi
% \begin{macro}{\Ba}
% |\Ba| is a macro for Barre (Ba).
% This macro accepts an optional argument for a prefix. If no option is 
% supplied, no prefix will be prepended.
%
%    \begin{macrocode}
\DeclareRobustCommand{\Ba}[1][ ]{\ensuremath{%
\expandafter\units@separator\mathrm{#1Ba}}}
%    \end{macrocode}
% \end{macro}
%\iffalse
%&lt;/package&gt;
%\fi
%
%\iffalse
%&lt;*package&gt;
%\fi
% \begin{macro}{\Torr}
% |\Torr| is a macro for Torr (Torr).
% This macro accepts an optional argument for a prefix. If no option is 
% supplied, no prefix will be prepended.
%
%    \begin{macrocode}
\DeclareRobustCommand{\Torr}[1][ ]{\ensuremath{%
\expandafter\units@separator\mathrm{#1Torr}}}
%    \end{macrocode}
% \end{macro}
%\iffalse
%&lt;/package&gt;
%\fi
%
%
% \subsection{Other}
%
%\iffalse
%&lt;*package&gt;
%\fi
% \begin{macro}{\mol}
% |\mol| is a macro for moles (mol).
%
%    \begin{macrocode}
\DeclareRobustCommand{\mol}{\ensuremath{%
\expandafter\units@separator\mathrm{mol}}}
%    \end{macrocode}
% \end{macro}
%\iffalse
%&lt;/package&gt;
%\fi
%
\makeatother

%
% \Finale
%
</pre></body></html>